50 100 150 200 250 300 350 0 2 4 6 8 10 12 Number of Idle Connections

time (0.1 sec) SiZer Map

time (0.1 sec) log10(h)

50 100 150 200 250 300 350

0.5

1

1.5

2

2.5

SiCon Map

time (0.1 sec)

50 100 150 200 250 300 350

0.5

1

1.5

2

2.5